soda_mg +RTS -bP -bp32 -bM -b-G -by1 -bl400

running runnable fetching blocked migrating

tasks

48

36 32 28 24 20 16 12 8 4 0

Average Parallelism = 14.8

Runtime = 493251

GrAnSim